70 cm eye-to-card distance

x100 x200 x10 x15 x20 x30 x50

1 deg

2 deg

3 deg

4 deg

5 deg

6 deg

0.01 rad

0.06 rad

0.08 rad

0.1 rad

70 cm eye-to-card distance

x100 x200 x10 x15 x20 x30 x50

1 deg

2 deg

3 deg

4 deg

5 deg

6 deg

0.01 rad

0.06 rad

0.08 rad

0.1 rad

70 cm eye-to-card distance

x100 x200 x10 x15 x20 x30 x50

1 deg

2 deg

3 deg

4 deg

5 deg

6 deg

0.01 rad

0.06 rad

0.08 rad

0.1 rad

70 cm eye-to-card distance

x100 x200 x10 x15 x20 x30 x50

1 deg

2 deg

3 deg

4 deg

5 deg

6 deg

0.01 rad

0.06 rad

0.08 rad

0.1 rad

70 cm eye-to-card distance

x100 x200 x10 x15 x20 x30 x50

1 deg

2 deg

3 deg

4 deg

5 deg

6 deg

0.01 rad

0.06 rad

0.08 rad

0.1 rad

70 cm eye-to-card distance

x100 x200 x10 x15 x20 x30 x50

1 deg

2 deg

3 deg

4 deg

5 deg

6 deg

0.01 rad

0.06 rad

0.08 rad

0.1 rad

70 cm eye-to-card distance

x100 x200 x10 x15 x20 x30 x50

1 deg

2 deg

3 deg

4 deg

5 deg

6 deg

0.01 rad

0.06 rad

0.08 rad

0.1 rad

70 cm eye-to-card distance

x100 x200 x10 x15 x20 x30 x50

1 deg

2 deg

3 deg

4 deg

5 deg

6 deg

0.01 rad

0.06 rad

0.08 rad

0.1 rad

70 cm eye-to-card distance

x100 x200 x10 x15 x20 x30 x50

1 deg

2 deg

3 deg

4 deg

5 deg

6 deg

0.01 rad

0.06 rad

0.08 rad

0.1 rad

70 cm eye-to-card distance

x100 x200 x10 x15 x20 x30 x50

1 deg

2 deg

3 deg

4 deg

5 deg

6 deg

0.01 rad

0.06 rad

0.08 rad

0.1 rad